UK PEW: Publishing Agreement

The purpose of this agreement is to provide the UK Performance Engineering Workshop with the necessary permission to publish your contribution to:

UK Computer and Telecommunications Performance Engineering Workshop 1998

hereinafter called the Work.

If excerpts from copyrighted works are included, you should obtain written permission from their copyright owners if necessary, and in any event show credit for the sources in your contribution. Copyright in photographs rests with the photographer unless it has been assigned in writing.

If it is appropriate, your employer may sign this agreement, and in any event your employer may reserve the right to use your material internally or for promotion purposes only by indicating it at the foot of this sheet. If this contribution was prepared jointly, the author who signs this agreement confirms that all co-authors agree to the terms stated here, and have given authority for the agreement to be signed on their behalf.

Exclusion clause for electronic distribution

The UK Performance Engineering Workshop grants non-exclusive rights to the author(s) to display and distribute [all/a substantial part of/an earlier version of] their article(s) through electronic distribution and through the printed technical reports series of Universities or other professional bodies.

Copyright Permission & Warranty

I, [name] . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . of [address] . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .. confirm that I am the copyright owner of my contribution, which is [insert a title or brief description]:

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . ..

Subject to the qualifications above I grant the UK Performance Engineering Workshop the non-exclusive right to publish this contribution in the Work. I warrant that this contribution is original (and has not been published before^�), and that it contains no libelous or unlawful statements, and does not infringe the rights of others.

[signature] . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . [date] . . . . . . . . . . . . . . . . . . . .

�Delete the words in brackets if they do not apply.